ALTER TABLE libraries
ADD scan_new_queue_health boolean NOT NULL DEFAULT false,
ADD scan_changed_queue_health boolean NOT NULL DEFAULT false,
ADD scan_new_queue_transcode boolean NOT NULL DEFAULT false,
ADD scan_changed_queue_transcode boolean NOT NULL DEFAULT false,
ADD health_ok_queue_transcode boolean NOT NULL DEFAULT false,
ADD transcode_replace boolean NOT NULL DEFAULT false,
ADD transcode_path VARCHAR (500) NOT NULL DEFAULT '';
